X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fab86f26bf792dc79c67968dad906e4afa00a98c..8060b0be0e5b8cc8b033158b8cfb241efeb82876:/docs/latex/wx/ctrlsub.tex?ds=sidebyside

diff --git a/docs/latex/wx/ctrlsub.tex b/docs/latex/wx/ctrlsub.tex
index 302e2722d8..afb99c037b 100644
--- a/docs/latex/wx/ctrlsub.tex
+++ b/docs/latex/wx/ctrlsub.tex
@@ -267,17 +267,6 @@ Returns {\tt true} if the control is empty or {\tt false} if it has some items.
 \helpref{GetCount}{wxcontrolwithitemsgetcount}
 
 
-\membersection{wxControlWithItems::Number}\label{wxcontrolwithitemsnumber}
-
-\constfunc{int}{Number}{\void}
-
-{\bf Obsolescence note:} This method is obsolete and was replaced with
-\helpref{GetCount}{wxcontrolwithitemsgetcount}, please use the new method in
-the new code. This method is only available if wxWidgets was compiled with
-{\tt WXWIN\_COMPATIBILITY\_2\_2} defined and will disappear completely in
-future versions.
-
-
 \membersection{wxControlWithItems::Select}\label{wxcontrolwithitemsselect}
 
 \func{void}{Select}{\param{int}{ n}}
