X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fab86f26bf792dc79c67968dad906e4afa00a98c..066f3611df971be93b2ec46b82c2f05f3ff9a422:/docs/latex/wx/app.tex

diff --git a/docs/latex/wx/app.tex b/docs/latex/wx/app.tex
index d29ee9d6db..b9ac70ab28 100644
--- a/docs/latex/wx/app.tex
+++ b/docs/latex/wx/app.tex
@@ -26,6 +26,10 @@ a reference to your application object) to be visible to other files.
 
 <wx/app.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxApp overview}{wxappoverview}
@@ -519,10 +523,13 @@ should return $0$ in case of successful termination.
 
 This function is called when an unhandled C++ exception occurs inside 
 \helpref{OnRun()}{wxapponrun} (the exceptions which occur during the program
-startup and shutdown might not be caught at all).
-Note that the exception type is lost by now, so if you want to really handle
-the exception you should override \helpref{OnRun()}{wxapponrun} and put a
-try/catch clause around the call to the base class version there.
+startup and shutdown might not be caught at all). Notice that by now the main
+event loop has been terminated and the program will exit, if you want to
+prevent this from happening (i.e. continue running after catching an exception)
+you need to override \helpref{OnExceptionInMainLoop}{wxapponexceptioninmainloop}.
+
+The default implementation shows information about the exception in debug build
+but does nothing in the release build.
 
 
 \membersection{wxApp::ProcessMessage}\label{wxappprocessmessage}
