X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fa482912e420a40e9f2e55a0f5407562826dd15e..eda40bfc08b7c15d395316768ea662959b5884b9:/docs/latex/wx/strmbase.tex

diff --git a/docs/latex/wx/strmbase.tex b/docs/latex/wx/strmbase.tex
index 0a6a5a38ef..243e5a48ef 100644
--- a/docs/latex/wx/strmbase.tex
+++ b/docs/latex/wx/strmbase.tex
@@ -43,7 +43,7 @@ Destructor.
 
 \constfunc{wxStreamError}{IsOk}{\void}
 
-Returns TRUE if no error occured on the stream.
+Returns TRUE if no error occurred on the stream.
 
 \wxheading{See also}
 
@@ -57,10 +57,10 @@ This function returns the last error.
 
 \twocolwidtha{5cm}
 \begin{twocollist}\itemsep=0pt
-\twocolitem{{\bf wxSTREAM\_NO\_ERROR}}{No error occured.}
-\twocolitem{{\bf wxSTREAM\_EOF}}{An End-Of-File occured.}
-\twocolitem{{\bf wxSTREAM\_WRITE\_ERROR}}{A generic error occured on the last write call.}
-\twocolitem{{\bf wxSTREAM\_READ\_ERROR}}{A generic error occured on the last read call.}
+\twocolitem{{\bf wxSTREAM\_NO\_ERROR}}{No error occurred.}
+\twocolitem{{\bf wxSTREAM\_EOF}}{An End-Of-File occurred.}
+\twocolitem{{\bf wxSTREAM\_WRITE\_ERROR}}{A generic error occurred on the last write call.}
+\twocolitem{{\bf wxSTREAM\_READ\_ERROR}}{A generic error occurred on the last read call.}
 \end{twocollist}
 
 \membersection{wxStreamBase::OnSysRead}\label{wxstreambaseonsysread}
