X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fa482912e420a40e9f2e55a0f5407562826dd15e..c57e060dc35e26d81cd091be409c12e7b406c5a0:/docs/latex/wx/time.tex

diff --git a/docs/latex/wx/time.tex b/docs/latex/wx/time.tex
index 59bad13e40..879462222c 100644
--- a/docs/latex/wx/time.tex
+++ b/docs/latex/wx/time.tex
@@ -16,7 +16,7 @@ may be withdrawn in future versions of wxWindows.
 
 \wxheading{Data structures}
 
-{\small \begin{verbatim}
+\begin{verbatim}
 typedef unsigned short hourTy;
 typedef unsigned short minuteTy;
 typedef unsigned short secondTy;
@@ -24,7 +24,6 @@ typedef unsigned long clockTy;
 enum tFormat { wx12h, wx24h };
 enum tPrecision { wxStdMinSec, wxStdMin };
 \end{verbatim}
-}
 
 \wxheading{See also}
 
