X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fa482912e420a40e9f2e55a0f5407562826dd15e..c50f92d08cc3633f8127931e7cf5d362ab8ac392:/docs/latex/wx/strmbase.tex?ds=sidebyside

diff --git a/docs/latex/wx/strmbase.tex b/docs/latex/wx/strmbase.tex
index 0a6a5a38ef..857394939e 100644
--- a/docs/latex/wx/strmbase.tex
+++ b/docs/latex/wx/strmbase.tex
@@ -43,7 +43,7 @@ Destructor.
 
 \constfunc{wxStreamError}{IsOk}{\void}
 
-Returns TRUE if no error occured on the stream.
+Returns true if no error occurred on the stream.
 
 \wxheading{See also}
 
@@ -57,10 +57,10 @@ This function returns the last error.
 
 \twocolwidtha{5cm}
 \begin{twocollist}\itemsep=0pt
-\twocolitem{{\bf wxSTREAM\_NO\_ERROR}}{No error occured.}
-\twocolitem{{\bf wxSTREAM\_EOF}}{An End-Of-File occured.}
-\twocolitem{{\bf wxSTREAM\_WRITE\_ERROR}}{A generic error occured on the last write call.}
-\twocolitem{{\bf wxSTREAM\_READ\_ERROR}}{A generic error occured on the last read call.}
+\twocolitem{{\bf wxSTREAM\_NO\_ERROR}}{No error occurred.}
+\twocolitem{{\bf wxSTREAM\_EOF}}{An End-Of-File occurred.}
+\twocolitem{{\bf wxSTREAM\_WRITE\_ERROR}}{A generic error occurred on the last write call.}
+\twocolitem{{\bf wxSTREAM\_READ\_ERROR}}{A generic error occurred on the last read call.}
 \end{twocollist}
 
 \membersection{wxStreamBase::OnSysRead}\label{wxstreambaseonsysread}
@@ -100,9 +100,5 @@ the file.
 \wxheading{Warning}
 
 There are streams which do not have size by definition, such as socket streams.
-In that cases, GetSize returns an invalid size represented by
-
-\begin{verbatim}
-~(size_t)0
-\end{verbatim}
+In that cases, GetSize returns $0$ so you should always test its return value.
 
