X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fa482912e420a40e9f2e55a0f5407562826dd15e..a9249b2eb2a40d8c71f828669045c4ddaa8dc5ff:/docs/latex/wx/nbsizer.tex?ds=sidebyside

diff --git a/docs/latex/wx/nbsizer.tex b/docs/latex/wx/nbsizer.tex
index b4be9489ab..9a9f915704 100644
--- a/docs/latex/wx/nbsizer.tex
+++ b/docs/latex/wx/nbsizer.tex
@@ -11,7 +11,7 @@ In order to query the size of notebook page, this page needs to have its
 own sizer, otherwise the wxNotebookSizer will ignore it. Notebook pages
 get there sizer by assiging one to them using \helpref{wxWindow::SetSizer}{wxwindowsetsizer} 
 and setting the auto-layout option to TRUE using 
-\helpref{wxWindow::SetAutolayout}{wxwindowsetautoLayout}. Here is one
+\helpref{wxWindow::SetAutoLayout}{wxwindowsetautolayout}. Here is one
 example showing how to add a notebook page that the notebook sizer is
 aware of:
 
