X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fa482912e420a40e9f2e55a0f5407562826dd15e..689fceb7a725f0000102fa080d1015ab22a58489:/docs/latex/wx/fontmap.tex

diff --git a/docs/latex/wx/fontmap.tex b/docs/latex/wx/fontmap.tex
index c9460d4a53..fbf85fdf19 100644
--- a/docs/latex/wx/fontmap.tex
+++ b/docs/latex/wx/fontmap.tex
@@ -31,10 +31,9 @@ for "equivalent" encodings (e.g. iso8859-2 and cp1250) and tries them.
 
 If you need to display text in encoding which is not available at
 host system (see \helpref{IsEncodingAvailable}{wxfontmapperisencodingavailable}),
-you may use these two classes to a) find font in some similar encoding
+you may use these two classes to find font in some similar encoding
 (see \helpref{GetAltForEncoding}{wxfontmappergetaltforencoding})
-and
-b) convert the text to this encoding 
+and convert the text to this encoding 
 (\helpref{wxEncodingConverter::Convert}{wxencodingconverterconvert}).
 
 Following code snippet demonstrates it:
