X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fa482912e420a40e9f2e55a0f5407562826dd15e..689fceb7a725f0000102fa080d1015ab22a58489:/docs/latex/wx/droptrgt.tex?ds=inline

diff --git a/docs/latex/wx/droptrgt.tex b/docs/latex/wx/droptrgt.tex
index 235118dd32..eb9ca1eed6 100644
--- a/docs/latex/wx/droptrgt.tex
+++ b/docs/latex/wx/droptrgt.tex
@@ -11,7 +11,7 @@ the whole window area, but only a small portion of it. The normal sequence of ca
 \helpref{OnEnter}{wxdroptargetonenter}, possibly many times \helpref{OnDragOver}{wxdroptargetondragover},
 \helpref{OnDrop}{wxdroptargetondrop} and finally \helpref{OnData}{wxdroptargetondata}.
 
-See \helpref{Drag'n'Drop overview}{wxdndoverview} and \helpref{wxDataObject overview}{wxdataobjectoverview}
+See \helpref{Drag and drop overview}{wxdndoverview} and \helpref{wxDataObject overview}{wxdataobjectoverview}
 for more information.
 
 \wxheading{Derived from}
