X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fa482912e420a40e9f2e55a0f5407562826dd15e..4770df95a0ace5e4e8f67e8ea85392e464fbaad2:/docs/latex/wx/inputstr.tex

diff --git a/docs/latex/wx/inputstr.tex b/docs/latex/wx/inputstr.tex
index 1b23a7b3dc..e830886624 100644
--- a/docs/latex/wx/inputstr.tex
+++ b/docs/latex/wx/inputstr.tex
@@ -91,7 +91,7 @@ Changes the stream current position.
 
 Returns the current stream position.
 
-\membersection{wxInputStream::Ungetch}\label{wxinputstream_ungetch}
+\membersection{wxInputStream::Ungetch}\label{wxinputstreamungetch}
 
 \func{size\_t}{Ungetch}{\param{const char*}{ buffer}, \param{size\_t}{ size}}
 
