X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fa482912e420a40e9f2e55a0f5407562826dd15e..3f3e668e3e3ca95f214f4f8ec0c3e1f21a94e6b5:/docs/latex/wx/ftp.tex

diff --git a/docs/latex/wx/ftp.tex b/docs/latex/wx/ftp.tex
index 07d711056e..e3c5050379 100644
--- a/docs/latex/wx/ftp.tex
+++ b/docs/latex/wx/ftp.tex
@@ -121,11 +121,11 @@ to specify a user and a password.
 % ----------------------------------------------------------------------------
 \membersection{wxFTP::GetList}
 
-\func{wxList *}{GetList}{\param{const wxString\&}{ wildcard}}
+\func{bool}{GetList}{\param{wxArrayString\& }{files}, \param{const wxString\&}{ wildcard = ""}}
 
 The GetList function is quite low-level. It returns the list of the files in
 the current directory. The list can be filtered using the {\it wildcard} string.
-If {\it wildcard} is a NULL string, it will return all files in directory.
+If {\it wildcard} is empty (default), it will return all files in directory.
 
 The form of the list can change from one peer system to another. For example,
 for a UNIX peer system, it will look like this:
@@ -146,7 +146,8 @@ winamp~1 exe    520196 02-25-1999  19:28  winamp204.exe
         1 file(s)           520 196 bytes
 \end{verbatim}
 
-The list is a string list and one node corresponds to a line sent by the peer.
+Return value: TRUE if the file list was successfully retrieved, FALSE
+otherwise.
 
 % ----------------------------------------------------------------------------
 
@@ -180,7 +181,7 @@ You will be notified when the EOF is reached by an error.
 
 \wxheading{Return value}
 
-Returns NULL if an error occured (it could be a network failure or the fact
+Returns NULL if an error occurred (it could be a network failure or the fact
 that the file doesn't exist).
 
 Returns the initialized stream. You will have to delete it yourself when you
