X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fa482912e420a40e9f2e55a0f5407562826dd15e..34bbbc276dc470014c8d200cfbbf7f588076aeaf:/docs/latex/wx/htwinprs.tex?ds=sidebyside

diff --git a/docs/latex/wx/htwinprs.tex b/docs/latex/wx/htwinprs.tex
index feea123a7c..cfdb392f39 100644
--- a/docs/latex/wx/htwinprs.tex
+++ b/docs/latex/wx/htwinprs.tex
@@ -80,7 +80,7 @@ Returns default horizontal alignment.
 
 \constfunc{int}{GetCharHeight}{\void}
 
-Returns (average) char height in standard font. It's used as DC-independent metrics.
+Returns (average) char height in standard font. It is used as DC-independent metrics.
 
 {\bf Note:} This function doesn't return the {\it actual} height. If you want to
 know the height of the current font, call {\tt GetDC -> GetCharHeight()}.
@@ -89,7 +89,7 @@ know the height of the current font, call {\tt GetDC -> GetCharHeight()}.
 
 \constfunc{int}{GetCharWidth}{\void}
 
-Returns average char width in standard font. It's used as DC-independent metrics.
+Returns average char width in standard font. It is used as DC-independent metrics.
 
 {\bf Note:} This function doesn't return the {\it actual} width. If you want to
 know the height of the current font, call {\tt GetDC -> GetCharWidth()}
