X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fa482912e420a40e9f2e55a0f5407562826dd15e..2fda2145700445519a0ce539b04dc72bae180124:/docs/latex/wx/propfovi.tex?ds=sidebyside

diff --git a/docs/latex/wx/propfovi.tex b/docs/latex/wx/propfovi.tex
index c252c940eb..281cd58425 100644
--- a/docs/latex/wx/propfovi.tex
+++ b/docs/latex/wx/propfovi.tex
@@ -34,7 +34,7 @@ association manually.
 
 \func{bool}{Check}{\void}
 
-Checks all properties by calling the appropriate validators; returns FALSE if a validation failed.
+Checks all properties by calling the appropriate validators; returns false if a validation failed.
 
 \membersection{wxPropertyFormView::GetPanel}\label{wxpropertyformviewgetpanel}
 
