X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fa482912e420a40e9f2e55a0f5407562826dd15e..2706e543a6923d8e743c6ec21fcfe898a52aec88:/docs/latex/wx/countstr.tex?ds=sidebyside

diff --git a/docs/latex/wx/countstr.tex b/docs/latex/wx/countstr.tex
index d2f1876f4b..0b62827a8b 100644
--- a/docs/latex/wx/countstr.tex
+++ b/docs/latex/wx/countstr.tex
@@ -3,7 +3,7 @@
 % -----------------------------------------------------------------------------
 \section{\class{wxCountingOutputStream}}\label{wxcountingoutputstream}
 
-wxCountingOutputStream is a specialized output stream which does not write any data anyway,
+wxCountingOutputStream is a specialized output stream which does not write any data anywhere,
 instead it counts how many bytes would get written if this were a normal stream. This
 can sometimes be useful or required if some data gets serialized to a stream or compressed
 by using stream compression and thus the final size of the stream cannot be known other
@@ -21,24 +21,28 @@ memory stream).
 
 <wx/stream.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 % -----------
 % ctor & dtor
 % -----------
-\membersection{wxCountingOutputStream::wxCountingOutputStream}
+\membersection{wxCountingOutputStream::wxCountingOutputStream}\label{wxcountingoutputstreamctor}
 
 \func{}{wxCountingOutputStream}{\void}
 
 Creates a wxCountingOutputStream object.
 
-\membersection{wxCountingOutputStream::\destruct{wxCountingOutputStream}}
+\membersection{wxCountingOutputStream::\destruct{wxCountingOutputStream}}\label{wxcountingoutputstreamdtor}
 
 \func{}{\destruct{wxCountingOutputStream}}{\void}
 
 Destructor.
 
-\membersection{wxCountingOutputStream::GetSize}
+\membersection{wxCountingOutputStream::GetSize}\label{wxcountingoutputstreamgetsize}
 
 \constfunc{size\_t}{GetSize}{\void}
 
