X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f8e045e24bb7f37af742fe6afb4a454fc900bfe5..751731864888f00e31e6dce1092ac28a1fac5358:/docs/latex/wx/function.tex?ds=sidebyside

diff --git a/docs/latex/wx/function.tex b/docs/latex/wx/function.tex
index b204d0b798..74500810d6 100644
--- a/docs/latex/wx/function.tex
+++ b/docs/latex/wx/function.tex
@@ -2566,7 +2566,7 @@ This macro returns the concatenation of two tokens \arg{x} and \arg{y}.
 \func{}{wxDYNLIB\_FUNCTION}{\param{}{type}, \param{}{name}, \param{}{dynlib}}
 
 When loading a function from a DLL you always have to cast the returned 
-\tt{void *} pointer to the correct type and, even more annoyingly, you have to
+{\tt{void *}} pointer to the correct type and, even more annoyingly, you have to
 repeat this type twice if you want to declare and define a function pointer all
 in one line
 
