X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f80bf901946b8b8013b98b51c2c2fd2bd195fe80..cdfb1ae1bcacb8327589a09e6a67f8fc1ef5a82e:/docs/latex/wx/wizard.tex

diff --git a/docs/latex/wx/wizard.tex b/docs/latex/wx/wizard.tex
index f3b09b3b31..6d0866a49b 100644
--- a/docs/latex/wx/wizard.tex
+++ b/docs/latex/wx/wizard.tex
@@ -137,13 +137,18 @@ also \helpref{GetBitmap}{wxwizardpagegetbitmap}.}
 \docparam{pos}{The position of the dialog, it will be centered on the screen
 by default.}
 
-\membersection{wxWizard::RunWizard}\label{wxwizardrunwizard}
+\membersection{wxWizard::Fit}\label{wxwizardfit}
 
-\func{bool}{RunWizard}{\param{wxWizardPage* }{firstPage}}
+\func{void}{Fit}{\param{const wxWizardPage* }{firstPage}}
 
-Executes the wizard starting from the given page, returns {\tt TRUE} if it was
-successfully finished or {\tt FALSE} if user cancelled it. The {\it firstPage} 
-can not be {\tt NULL}.
+Sets the page size to be big enough for all the pages accessible via the
+given {\it firstPage}, i.e. this page, its next page and so on.
+
+This method may be called more than once and it will only change the page size
+if the size required by the new page is bigger than the previously set one.
+This is useful if the decision about which pages to show is taken during the
+run-time as in this case, the wizard won't be able to get to all pages starting
+from a single one and you should call {\it Fit} separately for the others.
 
 \membersection{wxWizard::GetCurrentPage}\label{wxwizardgetcurrentpage}
 
@@ -158,6 +163,14 @@ Get the current page while the wizard is running. {\tt NULL} is returned if
 
 Returns the size available for the pages.
 
+\membersection{wxWizard::RunWizard}\label{wxwizardrunwizard}
+
+\func{bool}{RunWizard}{\param{wxWizardPage* }{firstPage}}
+
+Executes the wizard starting from the given page, returns {\tt TRUE} if it was
+successfully finished or {\tt FALSE} if user cancelled it. The {\it firstPage} 
+can not be {\tt NULL}.
+
 \membersection{wxWizard::SetPageSize}\label{wxwizardsetpagesize}
 
 \func{void}{SetPageSize}{\param{const wxSize\& }{sizePage}}
