X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f7bd26981f1c8d46d3909e3de90df081de4df33b..96db102a93ed103a1c757c4445dd71789c2d0054:/docs/latex/wx/button.tex?ds=sidebyside

diff --git a/docs/latex/wx/button.tex b/docs/latex/wx/button.tex
index 5abd58966e..7bac1a1118 100644
--- a/docs/latex/wx/button.tex
+++ b/docs/latex/wx/button.tex
@@ -12,12 +12,24 @@ almost any other window.
 \helpref{wxEvtHandler}{wxevthandler}\\
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/button.h>
+
 \wxheading{Window styles}
 
 There are no special styles for wxButton.
 
 See also \helpref{window styles overview}{windowstyles}.
 
+\wxheading{Event handling}
+
+\twocolwidtha{7cm}%
+\begin{twocollist}\itemsep=0pt
+\twocolitem{{\bf EVT\_BUTTON(id, func)}}{Process a wxEVT\_COMMAND\_BUTTON\_CLICKED event,
+when the button is clicked.}
+\end{twocollist}
+
 \wxheading{See also}
 
 \helpref{wxBitmapButton}{wxbitmapbutton}
@@ -87,6 +99,14 @@ The button's label.
 
 \helpref{wxButton::SetLabel}{wxbuttonsetlabel}
 
+\membersection{wxButton::GetDefaultSize}\label{wxbuttongetdefaultsize}
+
+\func{wxSize}{GetDefaultSize}{\void}
+
+Returns the default size for the buttons. It is advised to make all the dialog
+buttons of the same size and this function allows to retrieve the (platform and
+current font dependent size) which should be the best suited for this.
+
 \membersection{wxButton::SetDefault}\label{wxbuttonsetdefault}
 
 \func{void}{SetDefault}{\void}
