X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f7bd26981f1c8d46d3909e3de90df081de4df33b..0dbfd66d0b35352a0f60e7190b72815052b3d2d4:/docs/latex/wx/button.tex?ds=sidebyside

diff --git a/docs/latex/wx/button.tex b/docs/latex/wx/button.tex
index 5abd58966e..043d6d9d5e 100644
--- a/docs/latex/wx/button.tex
+++ b/docs/latex/wx/button.tex
@@ -12,12 +12,31 @@ almost any other window.
 \helpref{wxEvtHandler}{wxevthandler}\\
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/button.h>
+
 \wxheading{Window styles}
 
-There are no special styles for wxButton.
+\twocolwidtha{5cm}%
+\begin{twocollist}\itemsep=0pt
+\twocolitem{\windowstyle{wxBU\_LEFT}}{Left-justifies the label. WIN32 only.}
+\twocolitem{\windowstyle{wxBU\_TOP}}{Aligns the label to the top of the button. WIN32 only.}
+\twocolitem{\windowstyle{wxBU\_RIGHT}}{Right-justifies the bitmap label. WIN32 only.}
+\twocolitem{\windowstyle{wxBU\_BOTTOM}}{Aligns the label to the bottom of the button. WIN32 only.}
+\twocolitem{\windowstyle{wxBU\_EXACTFIT}}{Creates the button as small as possible instead of making it of the standard size (which is the default behaviour ).}
+\end{twocollist}
 
 See also \helpref{window styles overview}{windowstyles}.
 
+\wxheading{Event handling}
+
+\twocolwidtha{7cm}%
+\begin{twocollist}\itemsep=0pt
+\twocolitem{{\bf EVT\_BUTTON(id, func)}}{Process a wxEVT\_COMMAND\_BUTTON\_CLICKED event,
+when the button is clicked.}
+\end{twocollist}
+
 \wxheading{See also}
 
 \helpref{wxBitmapButton}{wxbitmapbutton}
@@ -87,6 +106,14 @@ The button's label.
 
 \helpref{wxButton::SetLabel}{wxbuttonsetlabel}
 
+\membersection{wxButton::GetDefaultSize}\label{wxbuttongetdefaultsize}
+
+\func{wxSize}{GetDefaultSize}{\void}
+
+Returns the default size for the buttons. It is advised to make all the dialog
+buttons of the same size and this function allows to retrieve the (platform and
+current font dependent size) which should be the best suited for this.
+
 \membersection{wxButton::SetDefault}\label{wxbuttonsetdefault}
 
 \func{void}{SetDefault}{\void}
@@ -100,7 +127,7 @@ Under Windows, only dialog box buttons respond to this function.  As
 normal under Windows and Motif, pressing return causes the default button to
 be depressed when the return key is pressed. See also \helpref{wxWindow::SetFocus}{wxwindowsetfocus}\rtfsp
 which sets the keyboard focus for windows and text panel items,\rtfsp
-and \helpref{wxWindow::GetDefaultItem}{wxwindowgetdefaultitem}.
+and \helpref{wxPanel::SetDefaultItem}{wxpanelsetdefaultitem}.
 
 Note that under Motif, calling this function immediately after
 creation of a button and before the creation of other buttons
