X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f70c044346a655e3115879ab2554bfd665139670..c9c537e6b06e7ca0160de52b7a91901aef0381e0:/docs/latex/wx/csconv.tex

diff --git a/docs/latex/wx/csconv.tex b/docs/latex/wx/csconv.tex
index 04de87657b..cfd32f7882 100644
--- a/docs/latex/wx/csconv.tex
+++ b/docs/latex/wx/csconv.tex
@@ -54,3 +54,4 @@ Converts from the selected character set to Unicode. Returns length of string wr
 \constfunc{size\_t}{WC2MB}{\param{char* }{buf}, \param{const wchar\_t* }{psz}, \param{size\_t }{n}}
 
 Converts from Unicode to the selected character set. Returns length of string written to destination buffer.
+
