X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f6e9a8189cfd9189418d6c0976a8a07f3bcd914b..6e65f80be5dfcc75bd520fc320d3389e4559bccf:/docs/latex/wx/frame.tex?ds=sidebyside

diff --git a/docs/latex/wx/frame.tex b/docs/latex/wx/frame.tex
index 3fe2a313f5..d145636166 100644
--- a/docs/latex/wx/frame.tex
+++ b/docs/latex/wx/frame.tex
@@ -34,7 +34,7 @@ application windows.
 \twocolitem{\windowstyle{wxMAXIMIZE\_BOX}}{Displays a maximize box on the frame.}
 \twocolitem{\windowstyle{wxCLOSE\_BOX}}{Displays a close box on the frame.}
 \twocolitem{\windowstyle{wxSTAY\_ON\_TOP}}{Stay on top of all other windows,
-see also wxFRAME\_FLOAT\_ON\_PARENT. Windows only.}
+see also wxFRAME\_FLOAT\_ON\_PARENT.}
 \twocolitem{\windowstyle{wxSYSTEM\_MENU}}{Displays a system menu.}
 \twocolitem{\windowstyle{wxRESIZE\_BORDER}}{Displays a resizeable border around the window.}
 \twocolitem{\windowstyle{wxFRAME\_TOOL\_WINDOW}}{Causes a frame with a small
@@ -61,6 +61,7 @@ frames having this style (the dialogs don't have a minimize or a maximize box by
 default)}
 \twocolitem{\windowstyle{wxFRAME\_SHAPED}}{Windows with this style are
   allowed to have their shape changed with the \helpref{SetShape}{wxtoplevelwindowsetshape} method.}
+\twocolitem{\windowstyle{wxFRAME\_EX\_METAL}}{On Mac OS X, frames with this style will be shown with a metallic look. This is an {\it extra} style.}
 \end{twocollist}
 
 The default frame style is for normal, resizeable frames. To create a frame
@@ -190,7 +191,7 @@ wxWidgets.}
 
 \wxheading{Return value}
 
-A pointer to the the status bar if it was created successfully, NULL otherwise.
+A pointer to the status bar if it was created successfully, NULL otherwise.
 
 \wxheading{Remarks}
 
@@ -227,7 +228,7 @@ wxWidgets.}
 
 \wxheading{Return value}
 
-A pointer to the the toolbar if it was created successfully, NULL otherwise.
+A pointer to the toolbar if it was created successfully, NULL otherwise.
 
 \wxheading{Remarks}
 
@@ -240,6 +241,11 @@ with \helpref{wxFrame::SetToolBar}{wxframesettoolbar}, the frame will manage the
 position and adjust the return value from \helpref{wxWindow::GetClientSize}{wxwindowgetclientsize} to
 reflect the available space for application windows.
 
+Under Pocket PC, you should {\it always} use this function for creating the toolbar
+to be managed by the frame, so that wxWidgets can use a combined
+menubar and toolbar. Where you manage your own toolbars, create a wxToolBar
+as usual.
+
 \wxheading{See also}
 
 \helpref{wxFrame::CreateStatusBar}{wxframecreatestatusbar},\rtfsp
@@ -482,7 +488,7 @@ Sets the widths of the fields in the status bar.
 
 \wxheading{Parameters}
 
-\wxheading{n}{The number of fields in the status bar. It must be the
+\docparam{n}{The number of fields in the status bar. It must be the
 same used in \helpref{CreateStatusBar}{wxframecreatestatusbar}.}
 
 \docparam{widths}{Must contain an array of {\it n} integers, each of which is a status field width
