X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f6e9a8189cfd9189418d6c0976a8a07f3bcd914b..21dc4be5d27fd73cda55795ab9d1e7e02b494c46:/docs/latex/wx/frame.tex

diff --git a/docs/latex/wx/frame.tex b/docs/latex/wx/frame.tex
index 3fe2a313f5..3f3bd4fa10 100644
--- a/docs/latex/wx/frame.tex
+++ b/docs/latex/wx/frame.tex
@@ -61,6 +61,7 @@ frames having this style (the dialogs don't have a minimize or a maximize box by
 default)}
 \twocolitem{\windowstyle{wxFRAME\_SHAPED}}{Windows with this style are
   allowed to have their shape changed with the \helpref{SetShape}{wxtoplevelwindowsetshape} method.}
+\twocolitem{\windowstyle{wxFRAME\_EX\_METAL}}{On Mac OS X, frames with this style will be shown with a metallic look. This is an {\it extra} style.}
 \end{twocollist}
 
 The default frame style is for normal, resizeable frames. To create a frame
@@ -240,6 +241,11 @@ with \helpref{wxFrame::SetToolBar}{wxframesettoolbar}, the frame will manage the
 position and adjust the return value from \helpref{wxWindow::GetClientSize}{wxwindowgetclientsize} to
 reflect the available space for application windows.
 
+Under Pocket PC, you should {\it always} use this function for creating the toolbar
+to be managed by the frame, so that wxWidgets can use a combined
+menubar and toolbar. Where you manage your own toolbars, create a wxToolBar
+as usual.
+
 \wxheading{See also}
 
 \helpref{wxFrame::CreateStatusBar}{wxframecreatestatusbar},\rtfsp
