X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f6bcfd974ef26faf6f91a62cac09827e09463fd1..fccb65a23c050b35fb29f7b8119a97ca7eb38fb7:/docs/latex/wx/droptrgt.tex?ds=inline

diff --git a/docs/latex/wx/droptrgt.tex b/docs/latex/wx/droptrgt.tex
index eb9ca1eed6..d9a489a581 100644
--- a/docs/latex/wx/droptrgt.tex
+++ b/docs/latex/wx/droptrgt.tex
@@ -32,7 +32,8 @@ enum wxDragResult
     wxDragError,    // error prevented the d&d operation from completing
     wxDragNone,     // drag target didn't accept the data
     wxDragCopy,     // the data was successfully copied
-    wxDragMove,     // the data was successfully moved
+    wxDragMove,     // the data was successfully moved (MSW only)
+    wxDragLink,     // operation is a drag-link
     wxDragCancel    // the operation was cancelled by user (not an error)
 };
 \end{verbatim}
@@ -70,7 +71,7 @@ calling its \helpref{wxDataObject::SetData}{wxdataobjectsetdata} method.
 
 \func{virtual wxDragResult}{OnData}{\param{wxCoord}{ x}, \param{wxCoord}{ y}, \param{wxDragResult}{ def}}
 
-Called after \helpref{OnDrop}{wxdroptargetondrop} returns TRUE. By default this
+Called after \helpref{OnDrop}{wxdroptargetondrop} returns true. By default this
 will usually \helpref{GetData}{wxdroptargetgetdata} and will return the suggested
 default value {\it def}.
 
@@ -78,7 +79,7 @@ default value {\it def}.
 
 \func{virtual bool}{OnDrop}{\param{wxCoord }{x}, \param{wxCoord }{y}}
 
-Called when the user drops a data object on the target. Return FALSE to veto the operation.
+Called when the user drops a data object on the target. Return false to veto the operation.
 
 \wxheading{Parameters}
 
@@ -88,7 +89,7 @@ Called when the user drops a data object on the target. Return FALSE to veto the
 
 \wxheading{Return value}
 
-Return TRUE to accept the data, FALSE to veto the operation.
+Return true to accept the data, false to veto the operation.
 
 \membersection{wxDropTarget::OnEnter}\label{wxdroptargetonenter}
 
