X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f6bcfd974ef26faf6f91a62cac09827e09463fd1..f973828cd9b31d3b80386fab5e6f7c4a106d97fc:/docs/latex/wx/stream.tex?ds=inline

diff --git a/docs/latex/wx/stream.tex b/docs/latex/wx/stream.tex
index a9f7c711c0..d82bbf9b91 100644
--- a/docs/latex/wx/stream.tex
+++ b/docs/latex/wx/stream.tex
@@ -91,7 +91,7 @@ accordingly until all requested data is read.
 
 It returns the size of the data read. If the returned size is different of the specified 
 {\it size}, an error has occurred and should be tested using 
-\helpref{LastError}{wxstreambaselasterror}.
+\helpref{GetLastError}{wxstreambasegetlasterror}.
 
 \func{size\_t}{Read}{\param{wxStreamBuffer *}{buffer}}
 
@@ -106,7 +106,7 @@ data anymore in the current buffer.
 
 \func{size\_t}{Write}{\param{const void *}{buffer}, \param{size\_t }{size}}
 
-Writes a block of the specified {\it size} using datas of {\it buffer}. The datas
+Writes a block of the specified {\it size} using data of {\it buffer}. The data
 are cached in a buffer before being sent in one block to the stream.
 
 \func{size\_t}{Write}{\param{wxStreamBuffer *}{buffer}}
@@ -250,14 +250,14 @@ Returns the current position (counted in bytes) in the stream buffer.
 
 \membersection{wxStreamBuffer::SetIntPosition}
 
-\func{void}{SetIntPosition}{\void}
+\func{void}{SetIntPosition}{\param{size\_t}{ pos}}
 
 Sets the current position (in bytes) in the stream buffer.
 
 \wxheading{Warning}
 
 Since it is a very low-level function, there is no check on the position:
-specify an invalid position can induce unexpected results.
+specifing an invalid position can induce unexpected results.
 
 \membersection{wxStreamBuffer::GetLastAccess}
 
@@ -270,8 +270,8 @@ Returns the amount of bytes read during the last IO call to the parent stream.
 \func{void}{Fixed}{\param{bool}{ fixed}}
 
 Toggles the fixed flag. Usually this flag is toggled at the same time as 
-{\it flushable}. This flag allows (when it has the FALSE value) or forbids
-(when it has the TRUE value) the stream buffer to resize dynamically the IO buffer.
+{\it flushable}. This flag allows (when it has the false value) or forbids
+(when it has the true value) the stream buffer to resize dynamically the IO buffer.
 
 \wxheading{See also}
 
@@ -281,7 +281,7 @@ Toggles the fixed flag. Usually this flag is toggled at the same time as
 
 \func{void}{Flushable}{\param{bool}{ flushable}}
 
-Toggles the flushable flag. If {\it flushable} is disabled, no datas are sent
+Toggles the flushable flag. If {\it flushable} is disabled, no data are sent
 to the parent stream.
 
 \membersection{wxStreamBuffer::FlushBuffer}
@@ -300,7 +300,7 @@ Fill the IO buffer.
 
 \func{size\_t}{GetDataLeft}{\void}
 
-Returns the amount of available datas in the buffer.
+Returns the amount of available data in the buffer.
 
 % --------------
 % Administration
