X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f6bcfd974ef26faf6f91a62cac09827e09463fd1..ebb396715d5ecd865a225fa3cf7675277ceb3f1b:/docs/latex/wx/print.tex

diff --git a/docs/latex/wx/print.tex b/docs/latex/wx/print.tex
index 0bdf7b6d16..8fa5bdd5a5 100644
--- a/docs/latex/wx/print.tex
+++ b/docs/latex/wx/print.tex
@@ -125,10 +125,10 @@ Returns the current print quality. This can be a positive integer, denoting the
 one of the following identifiers:
 
 \begin{verbatim}
-wxPRINT\_QUALITY\_HIGH
-wxPRINT\_QUALITY\_MEDIUM
-wxPRINT\_QUALITY\_LOW
-wxPRINT\_QUALITY\_DRAFT
+wxPRINT_QUALITY_HIGH
+wxPRINT_QUALITY_MEDIUM
+wxPRINT_QUALITY_LOW
+wxPRINT_QUALITY_DRAFT
 \end{verbatim}
 
 On input you should pass one of these identifiers, but on return you may get back a positive integer
@@ -262,10 +262,10 @@ Sets the desired print quality. This can be a positive integer, denoting the num
 one of the following identifiers:
 
 \begin{verbatim}
-wxPRINT\_QUALITY\_HIGH
-wxPRINT\_QUALITY\_MEDIUM
-wxPRINT\_QUALITY\_LOW
-wxPRINT\_QUALITY\_DRAFT
+wxPRINT_QUALITY_HIGH
+wxPRINT_QUALITY_MEDIUM
+wxPRINT_QUALITY_LOW
+wxPRINT_QUALITY_DRAFT
 \end{verbatim}
 
 On input you should pass one of these identifiers, but on return you may get back a positive integer
@@ -729,7 +729,8 @@ wxPrintPreview object to initiate printing or previewing.
 
 \func{}{wxPrintout}{\param{const wxString\& }{title = "Printout"}}
 
-Constructor. Pass an optional title argument (currently unused).
+Constructor. Pass an optional title argument - the curent filename would be a good idea. This will appear in the printing list
+(at least in MSW)
 
 \membersection{wxPrintout::\destruct{wxPrintout}}
 
@@ -760,6 +761,10 @@ it should be designed to take no parameters (other than the self
 reference) and to return a tuple of four integers.
 }
 
+\perlnote{When this method is overridden in a derived class,
+it must not take any parameters, an return a 4-element list.
+}
+
 \membersection{wxPrintout::GetPageSizeMM}\label{wxprintoutgetpagesizemm}
 
 \func{void}{GetPageSizeMM}{\param{int *}{w}, \param{int *}{h}}
@@ -768,6 +773,9 @@ Returns the size of the printer page in millimetres.
 
 \pythonnote{This method returns the output-only parameters as a tuple.}
 
+\perlnote{In wxPerl this method takes no arguments and returns a
+2-element list {\tt ( w, h )}}
+
 \membersection{wxPrintout::GetPageSizePixels}\label{wxprintoutgetpagesizepixels}
 
 \func{void}{GetPageSizePixels}{\param{int *}{w}, \param{int *}{h}}
@@ -781,6 +789,9 @@ previewing is to be supported.
 
 \pythonnote{This method returns the output-only parameters as a tuple.}
 
+\perlnote{In wxPerl this method takes no arguments and returns a
+2-element list {\tt ( w, h )}}
+
 \membersection{wxPrintout::GetPPIPrinter}\label{wxprintoutgetppiprinter}
 
 \func{void}{GetPPIPrinter}{\param{int *}{w}, \param{int *}{h}}
@@ -792,6 +803,9 @@ this by a scaling factor to take the preview DC size into account.
 
 \pythonnote{This method returns the output-only parameters as a tuple.}
 
+\perlnote{In wxPerl this method takes no arguments and returns a
+2-element list {\tt ( w, h )}}
+
 \membersection{wxPrintout::GetPPIScreen}\label{wxprintoutgetppiscreen}
 
 \func{void}{GetPPIScreen}{\param{int *}{w}, \param{int *}{h}}
@@ -801,8 +815,17 @@ Dividing the printer PPI by the screen PPI can give a suitable scaling
 factor for drawing text onto the printer. Remember to multiply
 this by a scaling factor to take the preview DC size into account.
 
+\membersection{wxPrintout::GetTitle}\label{wxprintoutgettitle}
+
+\func{wxString}{GetTitle}{\void}
+
+Returns the title of the printout
+
 \pythonnote{This method returns the output-only parameters as a tuple.}
 
+\perlnote{In wxPerl this method takes no arguments and returns a
+2-element list {\tt ( w, h )}}
+
 \membersection{wxPrintout::HasPage}\label{wxprintouthaspage}
 
 \func{bool}{HasPage}{\param{int}{ pageNum}}
@@ -830,7 +853,7 @@ checked) from within the overridden function, since it calls wxDC::StartDoc.
 
 \pythonnote{If this method is overridden in a Python class then the
 base class version can be called by using the method
-{\tt base_OnBeginDocument(startPage, endPage)}. }
+{\tt base\_OnBeginDocument(startPage, endPage)}. }
 
 \membersection{wxPrintout::OnEndDocument}\label{wxprintoutonenddocument}
 
