X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f6bcfd974ef26faf6f91a62cac09827e09463fd1..c65650d7b5472d00da0a0516ff1a2ccf53746319:/docs/latex/wx/mbcnvut7.tex?ds=sidebyside

diff --git a/docs/latex/wx/mbcnvut7.tex b/docs/latex/wx/mbcnvut7.tex
index 05185f17a9..34f51cb817 100644
--- a/docs/latex/wx/mbcnvut7.tex
+++ b/docs/latex/wx/mbcnvut7.tex
@@ -7,7 +7,8 @@
 
 This class converts between the UTF-7 encoding and Unicode.
 It has one predefined instance, {\bf wxConvUTF7}.
-Unfortunately, this class is not quite implemented yet.
+
+{\bf WARNING:} this class is not implemented yet.
 
 \wxheading{Derived from}
 
