X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f6bcfd974ef26faf6f91a62cac09827e09463fd1..bf7945cef10c0844a32e95695c544d829da9293a:/docs/latex/wx/statusbr.tex

diff --git a/docs/latex/wx/statusbr.tex b/docs/latex/wx/statusbr.tex
index 172178f3a0..7c1c99b309 100644
--- a/docs/latex/wx/statusbr.tex
+++ b/docs/latex/wx/statusbr.tex
@@ -207,6 +207,9 @@ Sets the number of fields, and optionally the field widths.
 \pythonnote{Only the first parameter is accepted.  Use SetStatusWidths
 to set the widths of the fields.}
 
+\perlnote{In wxPerl this function acceps only the {\tt n} parameter.
+Use SetStatusWidths to set the field widths.}
+
 \wxheading{Parameters}
 
 \docparam{number}{The number of fields.}
@@ -266,4 +269,5 @@ variable fields.
 \pythonnote{Only a single parameter is required, a Python list of
 integers.}
 
+\perlnote{In wxPerl this method takes as parameters the field widths.}
 
