X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f6bcfd974ef26faf6f91a62cac09827e09463fd1..bf7945cef10c0844a32e95695c544d829da9293a:/docs/latex/wx/htwindow.tex?ds=sidebyside

diff --git a/docs/latex/wx/htwindow.tex b/docs/latex/wx/htwindow.tex
index 622efd4e73..a763720138 100644
--- a/docs/latex/wx/htwindow.tex
+++ b/docs/latex/wx/htwindow.tex
@@ -98,6 +98,21 @@ Returns the related frame.
 Moves back to the previous page. (each page displayed using 
 \helpref{LoadPage}{wxhtmlwindowloadpage} is stored in history list.)
 
+\membersection{wxHtmlWindow::HistoryCanBack}\label{wxhtmlwindowhistorycanback}
+
+\func{bool}{HistoryCanBack}{\void}
+
+Returns true if it is possible to go back in the history (i.e. HistoryBack()
+won't fail).
+
+\membersection{wxHtmlWindow::HistoryCanForward}\label{wxhtmlwindowhistorycanforward}
+
+\func{bool}{HistoryCanForward}{\void}
+
+Returns true if it is possible to go forward in the history (i.e. HistoryBack()
+won't fail).
+
+
 \membersection{wxHtmlWindow::HistoryClear}\label{wxhtmlwindowhistoryclear}
 
 \func{void}{HistoryClear}{\void}
