X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f6bcfd974ef26faf6f91a62cac09827e09463fd1..bc253a97e78b2c42b93c1f3cc8e1bcceec68a336:/docs/latex/wx/mdi.tex

diff --git a/docs/latex/wx/mdi.tex b/docs/latex/wx/mdi.tex
index 1e59dcaf45..40420973e2 100644
--- a/docs/latex/wx/mdi.tex
+++ b/docs/latex/wx/mdi.tex
@@ -36,7 +36,7 @@ See also \helpref{window styles overview}{windowstyles}.
 
 \wxheading{Remarks}
 
-Although internally an MDI child frame is a child of the MDI client window, in wxWindows
+Although internally an MDI child frame is a child of the MDI client window, in wxWidgets
 you create it as a child of \helpref{wxMDIParentFrame}{wxmdiparentframe}. You can usually
 forget that the client window exists.
 
@@ -77,10 +77,10 @@ Constructor, creating the window.
 \docparam{title}{The caption to be displayed on the frame's title bar.}
 
 \docparam{pos}{The window position. A value of (-1, -1) indicates a default position, chosen by
-either the windowing system or wxWindows, depending on platform.}
+either the windowing system or wxWidgets, depending on platform.}
 
 \docparam{size}{The window size. A value of (-1, -1) indicates a default size, chosen by
-either the windowing system or wxWindows, depending on platform.}
+either the windowing system or wxWidgets, depending on platform.}
 
 \docparam{style}{The window style. See \helpref{wxMDIChildFrame}{wxmdichildframe}.}
 
@@ -241,7 +241,8 @@ and is used in many popular Windows applications, such as Microsoft Word(TM).
 There may be multiple MDI parent frames in a single application, but this probably only makes sense
 within programming development environments.
 
-Child frames may be either \helpref{wxMDIChildFrame}{wxmdichildframe}, or \helpref{wxFrame}{wxframe}.
+Child frames may be of class \helpref{wxMDIChildFrame}{wxmdichildframe} (contained
+within the parent frame) or \helpref{wxFrame}{wxframe} (shown as a top-level frame).
 
 An MDI parent frame always has a \helpref{wxMDIClientWindow}{wxmdiclientwindow} associated with it, which
 is the parent for MDI client frames.
@@ -310,10 +311,10 @@ Constructor, creating the window.
 \docparam{title}{The caption to be displayed on the frame's title bar.}
 
 \docparam{pos}{The window position. A value of (-1, -1) indicates a default position, chosen by
-either the windowing system or wxWindows, depending on platform.}
+either the windowing system or wxWidgets, depending on platform.}
 
 \docparam{size}{The window size. A value of (-1, -1) indicates a default size, chosen by
-either the windowing system or wxWindows, depending on platform.}
+either the windowing system or wxWidgets, depending on platform.}
 
 \docparam{style}{The window style. See \helpref{wxMDIParentFrame}{wxmdiparentframe}.}
 
@@ -432,7 +433,6 @@ automatically by the client window.
 
 \helpref{wxMDIParentFrame::GetToolBar}{wxmdiparentframegettoolbar},\rtfsp
 \helpref{wxMDIParentFrame::SetToolBar}{wxmdiparentframesettoolbar},\rtfsp
-\helpref{wxWindow}{wxwindowonsize},\rtfsp
 \helpref{wxMDIClientWindow}{wxmdiclientwindow}
 
 
@@ -469,7 +469,7 @@ Returns the window being used as the toolbar for this frame.
 
 \constfunc{wxMenu*}{GetWindowMenu}{\void}
 
-Returns the current Window menu (added by wxWindows to the menubar). This function
+Returns the current Window menu (added by wxWidgets to the menubar). This function
 is available under Windows only.
 
 \membersection{wxMDIParentFrame::OnCreateClient}\label{wxmdiparentframeoncreateclient}
@@ -493,7 +493,7 @@ on the background.
 
 Note that it is probably impossible to have a client window that scrolls as well as painting
 a bitmap or pattern, since in {\bf OnScroll}, the scrollbar positions always return zero.
-(Solutions to: \verb$julian.smart@ukonline.co.uk$).
+(Solutions to: {\tt julian.smart@btopenworld.com}).
 
 \wxheading{See also}
 
