X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f6bcfd974ef26faf6f91a62cac09827e09463fd1..ab9d0a8ca3d306898d92960ecfaefb8c1191b18a:/docs/latex/wx/tooltip.tex?ds=inline

diff --git a/docs/latex/wx/tooltip.tex b/docs/latex/wx/tooltip.tex
index 0430c381f7..14ee782ad5 100644
--- a/docs/latex/wx/tooltip.tex
+++ b/docs/latex/wx/tooltip.tex
@@ -26,6 +26,8 @@ alter tooltips behaviour.
 
 Enable or disable tooltips globally.
 
+May not be supported on all platforms (eg. wxCocoa).
+
 
 \membersection{wxToolTip::SetDelay}\label{wxtooltipsetdelay}
 
@@ -33,6 +35,7 @@ Enable or disable tooltips globally.
 
 Set the delay after which the tooltip appears.
 
+May not be supported on all platforms (eg. wxCocoa).
 
 \membersection{wxToolTip::wxToolTip}\label{wxtooltipwxtooltip}
 
