X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f6bcfd974ef26faf6f91a62cac09827e09463fd1..9154d8cfff9f6a58ccec94bf242086e7e10ea91b:/docs/latex/wx/timer.tex?ds=sidebyside

diff --git a/docs/latex/wx/timer.tex b/docs/latex/wx/timer.tex
index 62ddfb3f1a..97939eb2ba 100644
--- a/docs/latex/wx/timer.tex
+++ b/docs/latex/wx/timer.tex
@@ -101,6 +101,9 @@ If {\it oneShot} is FALSE (the default), the \helpref{Notify}{wxtimernotify}
 function will be called repeatedly until the timer is stopped. If TRUE,
 it will be called only once and the timer will stop automatically.
 
+If the timer was already running, it will be stopped by this method before
+restarting it.
+
 \membersection{wxTimer::Stop}\label{wxtimerstop}
 
 \func{void}{Stop}{\void}
