X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f6bcfd974ef26faf6f91a62cac09827e09463fd1..8a094d7ba9913333b49f8561d97b8309d0023663:/docs/latex/wx/strmbase.tex

diff --git a/docs/latex/wx/strmbase.tex b/docs/latex/wx/strmbase.tex
index 243e5a48ef..857394939e 100644
--- a/docs/latex/wx/strmbase.tex
+++ b/docs/latex/wx/strmbase.tex
@@ -43,7 +43,7 @@ Destructor.
 
 \constfunc{wxStreamError}{IsOk}{\void}
 
-Returns TRUE if no error occurred on the stream.
+Returns true if no error occurred on the stream.
 
 \wxheading{See also}
 
@@ -100,9 +100,5 @@ the file.
 \wxheading{Warning}
 
 There are streams which do not have size by definition, such as socket streams.
-In that cases, GetSize returns an invalid size represented by
-
-\begin{verbatim}
-~(size_t)0
-\end{verbatim}
+In that cases, GetSize returns $0$ so you should always test its return value.
 
