X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f6bcfd974ef26faf6f91a62cac09827e09463fd1..802df2b744052c0da6353e5ad4ade2f8dfcfdab8:/docs/latex/wx/flexsizr.tex?ds=sidebyside

diff --git a/docs/latex/wx/flexsizr.tex b/docs/latex/wx/flexsizr.tex
index 7004c0e1fa..d7456bbc21 100644
--- a/docs/latex/wx/flexsizr.tex
+++ b/docs/latex/wx/flexsizr.tex
@@ -1,15 +1,21 @@
 \section{\class{wxFlexGridSizer}}\label{wxflexgridsizer}
 
 A flex grid sizer is a sizer which lays out its children in a two-dimensional
-table with all table fields in one row having the same 
-height and all fields in one column having the same width.
+table with all table fields in one row having the same
+height and all fields in one column having the same width, but all
+rows or all columns are not necessarily the same height or width as in
+the \helpref{wxGridSizer}{wxgridsizer}.
 
 \wxheading{Derived from}
 
-\helpref{wxGridSizer}{wxsizer}\\
+\helpref{wxGridSizer}{wxgridsizer}\\
 \helpref{wxSizer}{wxsizer}\\
 \helpref{wxObject}{wxobject}
 
+\wxheading{See also}
+
+\helpref{wxSizer}{wxsizer}, \helpref{Sizer overview}{sizeroverview}
+
 \membersection{wxFlexGridSizer::wxFlexGridSizer}\label{wxflexgridsizerwxflexgridsizer}
 
 \func{}{wxFlexGridSizer}{\param{int }{rows}, \param{int }{cols}, \param{int }{vgap}, \param{int }{hgap}}
@@ -22,3 +28,30 @@ calculated to form the total number of children in the sizer, thus making the
 sizer grow dynamically. {\it vgap} and {\it hgap} define extra space between
 all children.
 
+
+\membersection{wxFlexGridSizer::AddGrowableCol}\label{wxflexgridsizeraddgrowablecol}
+
+\func{void}{AddGrowableCol}{\param{size\_t }{idx}}
+
+Specifies that column idx (starting from zero) should be grown if
+there is extra space available to the sizer.
+
+\membersection{wxFlexGridSizer::AddGrowableRow}\label{wxflexgridsizeraddgrowablerow}
+
+\func{void}{AddGrowableRow}{\param{size\_t }{idx}}
+
+Specifies that row idx (starting from zero) should be grown if there
+is extra space available to the sizer.
+
+\membersection{wxFlexGridSizer::RemoveGrowableCol}\label{wxflexgridsizerremovegrowablecol}
+
+\func{void}{RemoveGrowableCol}{\param{size\_t }{idx}}
+
+Specifies that column idx is no longer growable.
+
+\membersection{wxFlexGridSizer::RemoveGrowableRow}\label{wxflexgridsizerremovegrowablerow}
+
+\func{void}{RemoveGrowableRow}{\param{size\_t }{idx}}
+
+Specifies that row idx is no longer growable.
+
