X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f6bcfd974ef26faf6f91a62cac09827e09463fd1..79b4c33a16665f7e18de8651276f2deff707f498:/docs/latex/wx/ddeclint.tex

diff --git a/docs/latex/wx/ddeclint.tex b/docs/latex/wx/ddeclint.tex
index 2f5fc7a858..dbe2607587 100644
--- a/docs/latex/wx/ddeclint.tex
+++ b/docs/latex/wx/ddeclint.tex
@@ -30,7 +30,7 @@ wxClientBase\\
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxDDEClient::wxDDEClient}
+\membersection{wxDDEClient::wxDDEClient}\label{wxddeclientctor}
 
 \func{}{wxDDEClient}{\void}
 
@@ -59,14 +59,13 @@ object is returned.
 
 The advantage of deriving your own connection class is that it will
 enable you to intercept messages initiated by the server, such
-as \helpref{wxDDEConnection::OnAdvise}{wxddeconnectiononadvise}. You may also want to
+as \helpref{wxDDEConnection::OnAdvise}{wxconnectiononadvise}. You may also want to
 store application-specific data in instances of the new class.
 
-\membersection{wxDDEClient::ValidHost}
+\membersection{wxDDEClient::ValidHost}\label{wxddeclientvalidhost}
 
 \func{bool}{ValidHost}{\param{const wxString\& }{host}}
 
-Returns TRUE if this is a valid host name, FALSE otherwise. This always
-returns TRUE under MS Windows.
-
+Returns \true if this is a valid host name, \false otherwise. This always
+returns \true under MS Windows.
 
