X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f6bcfd974ef26faf6f91a62cac09827e09463fd1..513e0cea96dfcdc066d8b5b751c2874c7bf06a39:/docs/latex/wx/url.tex?ds=sidebyside

diff --git a/docs/latex/wx/url.tex b/docs/latex/wx/url.tex
index c648fb918a..13aca8fe80 100644
--- a/docs/latex/wx/url.tex
+++ b/docs/latex/wx/url.tex
@@ -100,7 +100,7 @@ It can be one of these errors:
 \func{wxInputStream *}{GetInputStream}{\void}
 
 Creates a new input stream on the the specified URL. You can use all but seek
-functionnality of wxStream. Seek isn't available on all stream. For example,
+functionality of wxStream. Seek isn't available on all stream. For example,
 http or ftp streams doesn't deal with it.
 
 \wxheading{Return value}
