X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f6bcfd974ef26faf6f91a62cac09827e09463fd1..3ac7b44cc0765b8444324d71b58cf648009d41c2:/docs/latex/wx/mdi.tex

diff --git a/docs/latex/wx/mdi.tex b/docs/latex/wx/mdi.tex
index 1e59dcaf45..391c38ec88 100644
--- a/docs/latex/wx/mdi.tex
+++ b/docs/latex/wx/mdi.tex
@@ -241,7 +241,8 @@ and is used in many popular Windows applications, such as Microsoft Word(TM).
 There may be multiple MDI parent frames in a single application, but this probably only makes sense
 within programming development environments.
 
-Child frames may be either \helpref{wxMDIChildFrame}{wxmdichildframe}, or \helpref{wxFrame}{wxframe}.
+Child frames may be of class \helpref{wxMDIChildFrame}{wxmdichildframe} (contained
+within the parent frame) or \helpref{wxFrame}{wxframe} (shown as a top-level frame).
 
 An MDI parent frame always has a \helpref{wxMDIClientWindow}{wxmdiclientwindow} associated with it, which
 is the parent for MDI client frames.
@@ -432,7 +433,6 @@ automatically by the client window.
 
 \helpref{wxMDIParentFrame::GetToolBar}{wxmdiparentframegettoolbar},\rtfsp
 \helpref{wxMDIParentFrame::SetToolBar}{wxmdiparentframesettoolbar},\rtfsp
-\helpref{wxWindow}{wxwindowonsize},\rtfsp
 \helpref{wxMDIClientWindow}{wxmdiclientwindow}
 
 
@@ -493,7 +493,7 @@ on the background.
 
 Note that it is probably impossible to have a client window that scrolls as well as painting
 a bitmap or pattern, since in {\bf OnScroll}, the scrollbar positions always return zero.
-(Solutions to: \verb$julian.smart@ukonline.co.uk$).
+(Solutions to: {\tt julian.smart@btopenworld.com}).
 
 \wxheading{See also}
 
