X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f6bcfd974ef26faf6f91a62cac09827e09463fd1..3ac7b44cc0765b8444324d71b58cf648009d41c2:/docs/latex/wx/dllload.tex

diff --git a/docs/latex/wx/dllload.tex b/docs/latex/wx/dllload.tex
index dc4210e08d..4c54aae8e6 100644
--- a/docs/latex/wx/dllload.tex
+++ b/docs/latex/wx/dllload.tex
@@ -17,11 +17,14 @@ loading of shared libraries and the resolving of symbols in them. There are no
 instances of this class, it simply serves as a namespace for its static member
 functions.
 
+Please note that class \helpref{wxDynamicLibrary}{wxdynamiclibrary} provides 
+alternative, friendlier interface to wxDllLoader.
+
 The terms {\it DLL} and {\it shared library/object} will both be used in the
 documentation to refer to the same thing: a {\tt .dll} file under Windows or 
 {\tt .so} or {\tt .sl} one under Unix.
 
-Example of using this class to dynamically load {\tt strlen()} function:
+Example of using this class to dynamically load the {\tt strlen()} function:
 
 \begin{verbatim}
 #if defined(__WXMSW__)
@@ -71,7 +74,7 @@ No base class
 
 \wxheading{Data structures}
 
-This header defines a platfrom-dependent {\tt wxDllType} typedef which stores
+This header defines a platform-dependent {\tt wxDllType} typedef which stores
 a handle to a loaded DLLs on the given platform.
 
 \latexignore{\rtfignore{\wxheading{Members}}}
@@ -120,8 +123,8 @@ an error occured.
 
 This function loads a shared library into memory, with {\it libname} being the
 name of the library: it may be either the full name including path and
-(platform-dependent) extenesion, just the basename (no path and no extension)
-or a basename with extentsion. In the last two cases, the library will be
+(platform-dependent) extension, just the basename (no path and no extension)
+or a basename with extension. In the last two cases, the library will be
 searched in all standard locations.
 
 Returns a handle to the loaded DLL. Use {\it success} parameter to test if it
@@ -132,8 +135,8 @@ is valid. If the handle is valid, the library must be unloaded later with
 
 \docparam{libname}{Name of the shared object to load.}
 
-\docparam{success}{May point to a bool variable which will be set to TRUE or
-FALSE; may also be {\tt NULL}.}
+\docparam{success}{May point to a bool variable which will be set to true or
+false; may also be {\tt NULL}.}
 
 \membersection{wxDllLoader::UnloadLibrary}\label{wxdllloaderunloadlibrary}
 
@@ -142,4 +145,3 @@ FALSE; may also be {\tt NULL}.}
 This function unloads the shared library. The handle {\it dllhandle} must have
 been returned by \helpref{LoadLibrary}{wxdllloaderloadlibrary} previously.
 
-
