X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f6bcfd974ef26faf6f91a62cac09827e09463fd1..3aa5d53272727835f297450e153ed79dc132e48a:/docs/latex/wx/socket.tex

diff --git a/docs/latex/wx/socket.tex b/docs/latex/wx/socket.tex
index 1a288d3348..3d54856730 100644
--- a/docs/latex/wx/socket.tex
+++ b/docs/latex/wx/socket.tex
@@ -1048,7 +1048,7 @@ For a detailed explanation, see \helpref{wxSocketBase::SetFlags}{wxsocketbaseset
 %
 \membersection{wxSocketClient::wxSocketClient}
 
-\func{}{wxSocketClient}{\param{wxSocketFlags}{ flags = wxSOCKET_NONE}}
+\func{}{wxSocketClient}{\param{wxSocketFlags}{ flags = wxSOCKET\_NONE}}
 
 Constructor.
 
@@ -1218,136 +1218,3 @@ it possible to use the same event handler for different sockets.
 
 Returns the socket event type.
 
-% ---------------------------------------------------------------------------
-% CLASS: wxSocketServer
-% ---------------------------------------------------------------------------
-\section{\class{wxSocketServer}}\label{wxsocketserver}
-
-\wxheading{Derived from}
-
-\helpref{wxSocketBase}{wxsocketbase}
-
-\wxheading{Include files}
-
-<wx/socket.h>
-
-% ---------------------------------------------------------------------------
-% Members
-% ---------------------------------------------------------------------------
-\latexignore{\rtfignore{\wxheading{Members}}}
-
-%
-% wxSocketServer
-%
-\membersection{wxSocketServer::wxSocketServer}\label{wxsocketserverconstr}
-
-\func{}{wxSocketServer}{\param{wxSockAddress\&}{ address}, \param{wxSocketFlags}{ flags = wxSOCKET_NONE}}
-
-Constructs a new server and tries to bind to the specified {\it address}.
-Before trying to accept new connections, test whether it succeeded with 
-\helpref{wxSocketBase::Ok}{wxsocketbaseok}.
-
-\wxheading{Parameters}
-
-\docparam{address}{Specifies the local address for the server (e.g. port number).}
-
-\docparam{flags}{Socket flags (See \helpref{wxSocketBase::SetFlags}{wxsocketbasesetflags})}
-
-%
-% ~wxSocketServer
-%
-\membersection{wxSocketServer::\destruct{wxSocketServer}}
-
-\func{}{\destruct{wxSocketServer}}{\void}
-
-Destructor (it doesn't close the accepted connections).
-
-%
-% Accept
-%
-\membersection{wxSocketServer::Accept}\label{wxsocketserveraccept}
-
-\func{wxSocketBase *}{Accept}{\param{bool}{ wait = TRUE}}
-
-Accepts an incoming connection request, and creates a new 
-\helpref{wxSocketBase}{wxsocketbase} object which represents
-the server-side of the connection.
-
-If {\it wait} is TRUE and there are no pending connections to be
-accepted, it will wait for the next incoming connection to
-arrive. {\bf Warning:} This will block the GUI.
-
-If {\it wait} is FALSE, it will try to accept a pending connection
-if there is one, but it will always return immediately without blocking
-the GUI. If you want to use Accept in this way, you can either check for
-incoming connections with \helpref{WaitForAccept}{wxsocketserverwaitforaccept} 
-or catch {\bf wxSOCKET\_CONNECTION} events, then call Accept once you know
-that there is an incoming connection waiting to be accepted.
-
-\wxheading{Return value}
-
-Returns an opened socket connection, or NULL if an error occurred or
-if the {\it wait} parameter was FALSE and there were no pending
-connections.
-
-\wxheading{See also}
-
-\helpref{wxSocketServer::WaitForAccept}{wxsocketserverwaitforaccept}, 
-\helpref{wxSocketBase::SetNotify}{wxsocketbasesetnotify}, 
-\helpref{wxSocketBase::Notify}{wxsocketbasenotify}, 
-\helpref{wxSocketServer::AcceptWith}{wxsocketserveracceptwith}
-
-%
-% AcceptWith
-%
-\membersection{wxSocketServer::AcceptWith}\label{wxsocketserveracceptwith}
-
-\func{bool}{AcceptWith}{\param{wxSocketBase\&}{ socket}, \param{bool}{ wait = TRUE}}
-
-Accept an incoming connection using the specified socket object.
-
-\wxheading{Parameters}
-
-\docparam{socket}{Socket to be initialized}
-
-\wxheading{Return value}
-
-Returns TRUE on success, or FALSE if an error occurred or if the
-{\it wait} parameter was FALSE and there were no pending
-connections.
-
-\helpref{wxSocketServer::WaitForAccept}{wxsocketserverwaitforaccept}, 
-\helpref{wxSocketBase::SetNotify}{wxsocketbasesetnotify}, 
-\helpref{wxSocketBase::Notify}{wxsocketbasenotify}, 
-\helpref{wxSocketServer::Accept}{wxsocketserveraccept}
-
-%
-% WaitForAccept
-%
-\membersection{wxSocketServer::WaitForAccept}\label{wxsocketserverwaitforaccept}
-
-\func{bool}{WaitForAccept}{\param{long}{ seconds = -1}, \param{long}{ millisecond = 0}}
-
-This function waits for an incoming connection. Use it if you want to call 
-\helpref{Accept}{wxsocketserveraccept} or \helpref{AcceptWith}{wxsocketserveracceptwith} 
-with {\it wait} set to FALSE, to detect when an incoming connection is waiting
-to be accepted.
-
-\wxheading{Parameters}
-
-\docparam{seconds}{Number of seconds to wait.
-If -1, it will wait for the default timeout,
-as set with \helpref{SetTimeout}{wxsocketbasesettimeout}.}
-
-\docparam{millisecond}{Number of milliseconds to wait.}
-
-\wxheading{Return value}
-
-Returns TRUE if an incoming connection arrived, FALSE if the timeout elapsed.
-
-\wxheading{See also}
-
-\helpref{wxSocketServer::Accept}{wxsocketserveraccept}, 
-\helpref{wxSocketServer::AcceptWith}{wxsocketserveracceptwith},
-\helpref{wxSocketBase::InterruptWait}{wxsocketbaseinterruptwait}
-
