X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f6bcfd974ef26faf6f91a62cac09827e09463fd1..34bbbc276dc470014c8d200cfbbf7f588076aeaf:/docs/latex/wx/print.tex

diff --git a/docs/latex/wx/print.tex b/docs/latex/wx/print.tex
index 0bdf7b6d16..088dca0e5f 100644
--- a/docs/latex/wx/print.tex
+++ b/docs/latex/wx/print.tex
@@ -125,10 +125,10 @@ Returns the current print quality. This can be a positive integer, denoting the
 one of the following identifiers:
 
 \begin{verbatim}
-wxPRINT\_QUALITY\_HIGH
-wxPRINT\_QUALITY\_MEDIUM
-wxPRINT\_QUALITY\_LOW
-wxPRINT\_QUALITY\_DRAFT
+wxPRINT_QUALITY_HIGH
+wxPRINT_QUALITY_MEDIUM
+wxPRINT_QUALITY_LOW
+wxPRINT_QUALITY_DRAFT
 \end{verbatim}
 
 On input you should pass one of these identifiers, but on return you may get back a positive integer
@@ -262,10 +262,10 @@ Sets the desired print quality. This can be a positive integer, denoting the num
 one of the following identifiers:
 
 \begin{verbatim}
-wxPRINT\_QUALITY\_HIGH
-wxPRINT\_QUALITY\_MEDIUM
-wxPRINT\_QUALITY\_LOW
-wxPRINT\_QUALITY\_DRAFT
+wxPRINT_QUALITY_HIGH
+wxPRINT_QUALITY_MEDIUM
+wxPRINT_QUALITY_LOW
+wxPRINT_QUALITY_DRAFT
 \end{verbatim}
 
 On input you should pass one of these identifiers, but on return you may get back a positive integer
@@ -830,7 +830,7 @@ checked) from within the overridden function, since it calls wxDC::StartDoc.
 
 \pythonnote{If this method is overridden in a Python class then the
 base class version can be called by using the method
-{\tt base_OnBeginDocument(startPage, endPage)}. }
+{\tt base\_OnBeginDocument(startPage, endPage)}. }
 
 \membersection{wxPrintout::OnEndDocument}\label{wxprintoutonenddocument}
 
