X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f6bcfd974ef26faf6f91a62cac09827e09463fd1..2e25e7b7629b9c362d1fc689b536032a35441b8c:/docs/latex/wx/dllload.tex

diff --git a/docs/latex/wx/dllload.tex b/docs/latex/wx/dllload.tex
index dc4210e08d..cacac58090 100644
--- a/docs/latex/wx/dllload.tex
+++ b/docs/latex/wx/dllload.tex
@@ -17,11 +17,14 @@ loading of shared libraries and the resolving of symbols in them. There are no
 instances of this class, it simply serves as a namespace for its static member
 functions.
 
+Please note that class \helpref{wxDynamicLibrary}{wxdynamiclibrary} provides 
+alternative, friendlier interface to wxDllLoader.
+
 The terms {\it DLL} and {\it shared library/object} will both be used in the
 documentation to refer to the same thing: a {\tt .dll} file under Windows or 
 {\tt .so} or {\tt .sl} one under Unix.
 
-Example of using this class to dynamically load {\tt strlen()} function:
+Example of using this class to dynamically load the {\tt strlen()} function:
 
 \begin{verbatim}
 #if defined(__WXMSW__)
@@ -142,4 +145,3 @@ FALSE; may also be {\tt NULL}.}
 This function unloads the shared library. The handle {\it dllhandle} must have
 been returned by \helpref{LoadLibrary}{wxdllloaderloadlibrary} previously.
 
-
