X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f6bcfd974ef26faf6f91a62cac09827e09463fd1..0532a2588121690115f4629cdcbc41d2049e50c0:/docs/latex/wx/stattext.tex

diff --git a/docs/latex/wx/stattext.tex b/docs/latex/wx/stattext.tex
index 433a509909..1b25980d42 100644
--- a/docs/latex/wx/stattext.tex
+++ b/docs/latex/wx/stattext.tex
@@ -19,7 +19,7 @@ A static text control displays one or more lines of read-only text.
 \begin{twocollist}\itemsep=0pt
 \twocolitem{\windowstyle{wxALIGN\_LEFT}}{Align the text to the left}
 \twocolitem{\windowstyle{wxALIGN\_RIGHT}}{Align the text to the right}
-\twocolitem{\windowstyle{wxALIGN\_CENTRE}}{Center the text (horisontally)}
+\twocolitem{\windowstyle{wxALIGN\_CENTRE}}{Center the text (horizontally)}
 \twocolitem{\windowstyle{wxST\_NO\_AUTORESIZE}}{By default, the control will
 adjust its size to exactly fit to the size of the text when 
 \helpref{SetLabel}{wxstatictextsetlabel} is called. If this style flag is
