X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f6bb64a625e2aa0234153dae65ee7c24809314e1..c2651b0a5c407ceb1693a865ee19d3d57e147c97:/docs/latex/wx/grid.tex

diff --git a/docs/latex/wx/grid.tex b/docs/latex/wx/grid.tex
index 74bd1f2a46..465a1dcec3 100644
--- a/docs/latex/wx/grid.tex
+++ b/docs/latex/wx/grid.tex
@@ -346,10 +346,6 @@ false to \helpref{wxGrid::EnableDragGridSize}{wxgridenabledraggridsize}
 Disables row sizing by dragging with the mouse. Equivalent to passing false to 
 \helpref{wxGrid::EnableDragRowSize}{wxgridenabledragrowsize}. 
 
-\membersection{wxGrid::DoGetBestSize}\label{wxgriddogetbestsize}
-
-\constfunc{wxSize}{DoGetBestSize}{\void}
-
 \membersection{wxGrid::EnableCellEditControl}\label{wxgridenablecelleditcontrol}
 
 \func{void}{EnableCellEditControl}{\param{bool }{enable = true}}
