X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f6bb64a625e2aa0234153dae65ee7c24809314e1..0fec2f73ecb616a2189f95c340e9fa7e5cc2350f:/docs/latex/wx/window.tex?ds=sidebyside

diff --git a/docs/latex/wx/window.tex b/docs/latex/wx/window.tex
index 08564bb8ff..437cd23a79 100644
--- a/docs/latex/wx/window.tex
+++ b/docs/latex/wx/window.tex
@@ -173,6 +173,13 @@ called by the user code.
 \docparam{child}{Child window to add.}
 
 
+\membersection{wxWindow::CacheBestSize}\label{wxwindowcachebestsize}
+
+\constfunc{void}{CacheBestSize}{\param{const wxSize\& }{size}}
+
+Sets the cached best size value.
+
+
 \membersection{wxWindow::CaptureMouse}\label{wxwindowcapturemouse}
 
 \func{virtual void}{CaptureMouse}{\void}
@@ -470,6 +477,15 @@ Returns {\tt true} if the window has been disabled, {\tt false} if it had been
 already disabled before the call to this function.
 
 
+\membersection{wxWindow::DoGetBestSize}\label{wxwindowdogetbestsize}
+
+\constfunc{virtual wxSize}{DoGetBestSize}{\void}
+
+Gets the size which best suits the window: for a control, it would be
+the minimal size which doesn't truncate the control, for a panel - the
+same size as it would have after a call to \helpref{Fit()}{wxwindowfit}.
+
+
 \membersection{wxWindow::DoUpdateWindowUI}\label{wxwindowdoupdatewindowui}
 
 \func{virtual void}{DoUpdateWindowUI}{\param{wxUpdateUIEvent\&}{ event}}
@@ -655,8 +671,8 @@ be called to reenable window redrawing. Calls to these two functions may be
 nested.
 
 This method is useful for visual appearance optimization (for example, it
-is a good idea to use it before inserting large amount of text into a
-wxTextCtrl under wxGTK) but is not implemented on all platforms nor for all
+is a good idea to use it before doing many large text insertions in a row into
+a wxTextCtrl under wxGTK) but is not implemented on all platforms nor for all
 controls so it is mostly just a hint to wxWidgets and not a mandatory
 directive.
 
@@ -1350,6 +1366,13 @@ Sends an {\tt wxEVT\_INIT\_DIALOG} event, whose handler usually transfers data
 to the dialog via validators.
 
 
+\membersection{wxWindow::InvalidateBestSize}\label{wxwindowinvalidatebestsize}
+
+\func{void}{InvalidateBestSize}{\void}
+
+Resets the cached best size value so it will be recalculated the next time it is needed.
+
+
 \membersection{wxWindow::IsEnabled}\label{wxwindowisenabled}
 
 \constfunc{virtual bool}{IsEnabled}{\void}
@@ -2585,6 +2608,13 @@ the constraints automatically in OnSize; otherwise, you must override OnSize and
 explicitly. When setting both a wxLayoutConstraints and a \helpref{wxSizer}{wxsizer}, only the
 sizer will have effect.
 
+\membersection{wxWindow::SetInitialBestSize}\label{wxwindowsetinitialbestsize}
+
+\func{virtual void}{SetInitialBestSize}{\param{const wxSize\& }{size}}
+
+Sets the initial window size if none is given (i.e. at least one of the
+components of the size passed to ctor/Create() is wxDefaultCoord).
+
 \membersection{wxWindow::SetMaxSize}\label{wxwindowsetmaxsize}
 
 \func{void}{SetMaxSize}{\param{const wxSize\& }{size}}
