X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f6106dae23c334c30e5e1f2f0763468f61ecce55..de279b5406eaa3381c197ca3f0b971d0b385cff1:/docs/latex/wx/datistrm.tex?ds=sidebyside

diff --git a/docs/latex/wx/datistrm.tex b/docs/latex/wx/datistrm.tex
index afca32b111..4c30437f70 100644
--- a/docs/latex/wx/datistrm.tex
+++ b/docs/latex/wx/datistrm.tex
@@ -1,7 +1,7 @@
 \section{\class{wxDataInputStream}}\label{wxdatainputstream}
 
 This class provides functions that read binary data types in a
-portable way. Data can be read in either big-endian or litte-endian
+portable way. Data can be read in either big-endian or little-endian
 format, little-endian being the default on all architectures.
 
 If you want to read data from text files (or streams) use 
@@ -39,62 +39,106 @@ None
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxDataInputStream::wxDataInputStream}\label{wxdatainputstreamconstr}
+\membersection{wxDataInputStream::wxDataInputStream}\label{wxdatainputstreamctor}
 
 \func{}{wxDataInputStream}{\param{wxInputStream\&}{ stream}}
 
+\func{}{wxDataInputStream}{\param{wxInputStream\&}{ stream}, \param{wxMBConv\&}{ conv = wxMBConvUTF8}}
+
 Constructs a datastream object from an input stream. Only read methods will
-be available.
+be available. The second form is only available in Unicode build of wxWidgets.
 
 \wxheading{Parameters}
 
 \docparam{stream}{The input stream.}
 
-\membersection{wxDataInputStream::\destruct{wxDataInputStream}}
+\docparam{conv}{Charset conversion object object used to decode strings in Unicode 
+mode (see \helpref{wxDataInputStream::ReadString}{wxdatainputstreamreadstring}
+documentation for detailed description). Note that you must not destroy
+{\it conv} before you destroy this wxDataInputStream instance!}
+
+\membersection{wxDataInputStream::\destruct{wxDataInputStream}}\label{wxdatainputstreamdtor}
 
 \func{}{\destruct{wxDataInputStream}}{\void}
 
 Destroys the wxDataInputStream object.
 
-\membersection{wxDataInputStream::BigEndianOrdered}
+\membersection{wxDataInputStream::BigEndianOrdered}\label{wxdatainputstreambigendianordered}
 
 \func{void}{BigEndianOrdered}{\param{bool}{ be\_order}}
 
-If {\it be\_order} is TRUE, all data will be read in big-endian
+If {\it be\_order} is true, all data will be read in big-endian
 order, such as written by programs on a big endian architecture 
 (e.g. Sparc) or written by Java-Streams (which always use 
 big-endian order).
   
-\membersection{wxDataInputStream::Read8}
+\membersection{wxDataInputStream::Read8}\label{wxdatainputstreamread8}
 
 \func{wxUint8}{Read8}{\void}
 
 Reads a single byte from the stream.
 
-\membersection{wxDataInputStream::Read16}
+\func{void}{Read8}{\param{wxUint8 *}{buffer}, \param{size\_t }{size}}
+
+Reads bytes from the stream in a specified buffer. The amount of
+bytes to read is specified by the {\it size} variable.
+
+\membersection{wxDataInputStream::Read16}\label{wxdatainputstreamread16}
 
 \func{wxUint16}{Read16}{\void}
 
-Reads a 16 bit integer from the stream.
+Reads a 16 bit unsigned integer from the stream.
 
-\membersection{wxDataInputStream::Read32}
+\func{void}{Read16}{\param{wxUint16 *}{buffer}, \param{size\_t }{size}}
+
+Reads 16 bit unsigned integers from the stream in a specified buffer. the
+amount of 16 bit unsigned integer to read is specified by the {\it size} variable.
+
+\membersection{wxDataInputStream::Read32}\label{wxdatainputstreamread32}
 
 \func{wxUint32}{Read32}{\void}
 
-Reads a 32 bit integer from the stream.
+Reads a 32 bit unsigned integer from the stream.
+
+\func{void}{Read32}{\param{wxUint32 *}{buffer}, \param{size\_t }{size}}
+
+Reads 32 bit unsigned integers from the stream in a specified buffer. the amount of
+32 bit unsigned integer to read is specified by the {\it size} variable.
 
-\membersection{wxDataInputStream::ReadDouble}
+\membersection{wxDataInputStream::Read64}\label{wxdatainputstreamread64}
+
+\func{wxUint64}{Read64}{\void}
+
+Reads a 64 bit unsigned integer from the stream.
+
+\func{void}{Read64}{\param{wxUint64 *}{buffer}, \param{size\_t }{size}}
+
+Reads 64 bit unsigned integers from the stream in a specified buffer. the amount of
+64 bit unsigned integer to read is specified by the {\it size} variable.
+
+\membersection{wxDataInputStream::ReadDouble}\label{wxdatainputstreamreaddouble}
 
 \func{double}{ReadDouble}{\void}
 
 Reads a double (IEEE encoded) from the stream.
 
-\membersection{wxDataInputStream::ReadString}
+\func{void}{ReadDouble}{\param{double *}{buffer}, \param{size\_t }{size}}
+
+Reads double data (IEEE encoded) from the stream in a specified buffer. the amount of
+double to read is specified by the {\it size} variable.
+
+\membersection{wxDataInputStream::ReadString}\label{wxdatainputstreamreadstring}
 
 \func{wxString}{ReadString}{\void}
 
-Reads a string from a stream. Actually, this function first reads a long integer
-specifying the length of the string (without the last null character) and then
-reads the string.
+Reads a string from a stream. Actually, this function first reads a long 
+integer specifying the length of the string (without the last null character) 
+and then reads the string.
+
+In Unicode build of wxWidgets, the fuction first reads multibyte (char*)
+string from the stream and then converts it to Unicode using the {\it conv}
+object passed to constructor and returns the result as wxString. You are
+responsible for using the same convertor as when writing the stream.
 
+See also \helpref{wxDataOutputStream::WriteString}{wxdataoutputstreamwritestring}.
 
