X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f59d80ca00e0ef9963c771a26decd605a85d5596..4f690a1d5e6192d0861686982e89f9f17a21e679:/docs/latex/wx/droptrgt.tex?ds=sidebyside

diff --git a/docs/latex/wx/droptrgt.tex b/docs/latex/wx/droptrgt.tex
index db5b38d78a..d9a489a581 100644
--- a/docs/latex/wx/droptrgt.tex
+++ b/docs/latex/wx/droptrgt.tex
@@ -1,7 +1,5 @@
 \section{\class{wxDropTarget}}\label{wxdroptarget}
 
-\overview{Overview}{wxdndoverview}
-
 This class represents a target for a drag and drop operation. A \helpref{wxDataObject}{wxdataobject}
 can be associated with it and by default, this object will be filled with the data from the
 drag source, if the data formats supported by the data object match the drag source data 
@@ -13,6 +11,9 @@ the whole window area, but only a small portion of it. The normal sequence of ca
 \helpref{OnEnter}{wxdroptargetonenter}, possibly many times \helpref{OnDragOver}{wxdroptargetondragover},
 \helpref{OnDrop}{wxdroptargetondrop} and finally \helpref{OnData}{wxdroptargetondata}.
 
+See \helpref{Drag and drop overview}{wxdndoverview} and \helpref{wxDataObject overview}{wxdataobjectoverview}
+for more information.
+
 \wxheading{Derived from}
 
 None
@@ -25,21 +26,21 @@ None
 
 \index{wxDragResult}wxDragResult is defined as follows:
 
-{\small\begin{verbatim}
+\begin{verbatim}
 enum wxDragResult
 {
     wxDragError,    // error prevented the d&d operation from completing
     wxDragNone,     // drag target didn't accept the data
     wxDragCopy,     // the data was successfully copied
-    wxDragMove,     // the data was successfully moved
+    wxDragMove,     // the data was successfully moved (MSW only)
+    wxDragLink,     // operation is a drag-link
     wxDragCancel    // the operation was cancelled by user (not an error)
 };
 \end{verbatim}
-}
 
 \wxheading{See also}
 
-\helpref{Drag and drop overview}{wxdndoverview}, \helpref{wxDropSource}{wxdropsource}, 
+\helpref{wxDropSource}{wxdropsource}, 
 \helpref{wxTextDropTarget}{wxtextdroptarget}, \helpref{wxFileDropTarget}{wxfiledroptarget},
 \helpref{wxDataFormat}{wxdataformat}, \helpref{wxDataObject}{wxdataobject}
 
@@ -70,7 +71,7 @@ calling its \helpref{wxDataObject::SetData}{wxdataobjectsetdata} method.
 
 \func{virtual wxDragResult}{OnData}{\param{wxCoord}{ x}, \param{wxCoord}{ y}, \param{wxDragResult}{ def}}
 
-Called after \helpref{OnDrop}{wxdroptargetondrop} returns TRUE. By default this
+Called after \helpref{OnDrop}{wxdroptargetondrop} returns true. By default this
 will usually \helpref{GetData}{wxdroptargetgetdata} and will return the suggested
 default value {\it def}.
 
@@ -78,7 +79,7 @@ default value {\it def}.
 
 \func{virtual bool}{OnDrop}{\param{wxCoord }{x}, \param{wxCoord }{y}}
 
-Called when the user drops a data object on the target. Return FALSE to veto the operation.
+Called when the user drops a data object on the target. Return false to veto the operation.
 
 \wxheading{Parameters}
 
@@ -88,7 +89,7 @@ Called when the user drops a data object on the target. Return FALSE to veto the
 
 \wxheading{Return value}
 
-Return TRUE to accept the data, FALSE to veto the operation.
+Return true to accept the data, false to veto the operation.
 
 \membersection{wxDropTarget::OnEnter}\label{wxdroptargetonenter}
 
@@ -141,3 +142,4 @@ Called when the mouse leaves the drop target.
 
 Sets the data \helpref{wxDataObject}{wxdataobject} associated with the 
 drop target and deletes any previously associated data object.
+
