X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f510b7b2f386afe6c3705c2cdbc9208435984dac..fc17828ab2cb3dc5dd22d5634ce4f6764e1373fc:/docs/latex/wx/countstr.tex

diff --git a/docs/latex/wx/countstr.tex b/docs/latex/wx/countstr.tex
index 056fd67fd6..d55f284ea5 100644
--- a/docs/latex/wx/countstr.tex
+++ b/docs/latex/wx/countstr.tex
@@ -3,7 +3,7 @@
 % -----------------------------------------------------------------------------
 \section{\class{wxCountingOutputStream}}\label{wxcountingoutputstream}
 
-wxCountingOutputStream is a specialized output stream which does not write any data anyway,
+wxCountingOutputStream is a specialized output stream which does not write any data anywhere,
 instead it counts how many bytes would get written if this were a normal stream. This
 can sometimes be useful or required if some data gets serialized to a stream or compressed
 by using stream compression and thus the final size of the stream cannot be known other
