X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f510b7b2f386afe6c3705c2cdbc9208435984dac..f6e9a8189cfd9189418d6c0976a8a07f3bcd914b:/docs/latex/wx/config.tex

diff --git a/docs/latex/wx/config.tex b/docs/latex/wx/config.tex
index 6b2dc4fd7c..ac188139cf 100644
--- a/docs/latex/wx/config.tex
+++ b/docs/latex/wx/config.tex
@@ -395,7 +395,7 @@ your application's responsibility to ensure that there is no newline or
 other illegal characters in a value, before writing that value to the file.}
 
 \docparam{conv}{This parameter is only used by wxFileConfig when compiled
-in Unicode mode. It specifies the encoding in what the configuration file
+in Unicode mode. It specifies the encoding in which the configuration file
 is written.}
 
 
