X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f510b7b2f386afe6c3705c2cdbc9208435984dac..c2651b0a5c407ceb1693a865ee19d3d57e147c97:/docs/latex/wx/conditn.tex

diff --git a/docs/latex/wx/conditn.tex b/docs/latex/wx/conditn.tex
index c14e7e5f6f..c39e2c1689 100644
--- a/docs/latex/wx/conditn.tex
+++ b/docs/latex/wx/conditn.tex
@@ -119,7 +119,7 @@ Default and only constructor. The {\it mutex} must be locked by the caller
 before calling \helpref{Wait}{wxconditionwait} function.
 
 Use \helpref{IsOk}{wxconditionisok} to check if the object was successfully
-intiialized.
+initialized.
 
 \membersection{wxCondition::\destruct{wxCondition}}\label{wxconditiondtor}
 
@@ -145,7 +145,7 @@ not.
 \constfunc{bool}{IsOk}{\void}
 
 Returns {\tt true} if the object had been initialized successfully, {\tt false} 
-if an error occured.
+if an error occurred.
 
 \membersection{wxCondition::Signal}\label{wxconditionsignal}
 
@@ -181,7 +181,7 @@ Wait or the thread may sleep forever.
 
 \wxheading{Return value}
 
-Returns {\tt wxCOND\_NO\_ERROR} on success, another value if an error occured.
+Returns {\tt wxCOND\_NO\_ERROR} on success, another value if an error occurred.
 
 \wxheading{See also}
 
@@ -190,7 +190,7 @@ Returns {\tt wxCOND\_NO\_ERROR} on success, another value if an error occured.
 
 \membersection{wxCondition::WaitTimeout}\label{wxconditionwaittimeout}
 
-\func{wxCondError}{Wait}{\param{unsigned long}{ milliseconds}}
+\func{wxCondError}{WaitTimeout}{\param{unsigned long}{ milliseconds}}
 
 Waits until the condition is signalled or the timeout has elapsed.
 
@@ -205,6 +205,6 @@ timeout expires.
 \wxheading{Return value}
 
 Returns {\tt wxCOND\_NO\_ERROR} if the condition was signalled, 
-{\tt wxCOND\_TIMEOUT} if the timeout elapsed ebfore this happened or another
+{\tt wxCOND\_TIMEOUT} if the timeout elapsed before this happened or another
 error code from wxCondError enum.
 
