X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f510b7b2f386afe6c3705c2cdbc9208435984dac..78cd9c69eb3f4c158fe10ce49325d57ec05d1306:/docs/latex/wx/countstr.tex?ds=inline

diff --git a/docs/latex/wx/countstr.tex b/docs/latex/wx/countstr.tex
index 056fd67fd6..0b62827a8b 100644
--- a/docs/latex/wx/countstr.tex
+++ b/docs/latex/wx/countstr.tex
@@ -3,7 +3,7 @@
 % -----------------------------------------------------------------------------
 \section{\class{wxCountingOutputStream}}\label{wxcountingoutputstream}
 
-wxCountingOutputStream is a specialized output stream which does not write any data anyway,
+wxCountingOutputStream is a specialized output stream which does not write any data anywhere,
 instead it counts how many bytes would get written if this were a normal stream. This
 can sometimes be useful or required if some data gets serialized to a stream or compressed
 by using stream compression and thus the final size of the stream cannot be known other
@@ -21,6 +21,10 @@ memory stream).
 
 <wx/stream.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 % -----------
