X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f510b7b2f386afe6c3705c2cdbc9208435984dac..77d47192a89f7142f93c103760c8cbb824ec961d:/docs/latex/wx/conditn.tex

diff --git a/docs/latex/wx/conditn.tex b/docs/latex/wx/conditn.tex
index c14e7e5f6f..2549e477f6 100644
--- a/docs/latex/wx/conditn.tex
+++ b/docs/latex/wx/conditn.tex
@@ -119,7 +119,7 @@ Default and only constructor. The {\it mutex} must be locked by the caller
 before calling \helpref{Wait}{wxconditionwait} function.
 
 Use \helpref{IsOk}{wxconditionisok} to check if the object was successfully
-intiialized.
+initialized.
 
 \membersection{wxCondition::\destruct{wxCondition}}\label{wxconditiondtor}
 
@@ -205,6 +205,6 @@ timeout expires.
 \wxheading{Return value}
 
 Returns {\tt wxCOND\_NO\_ERROR} if the condition was signalled, 
-{\tt wxCOND\_TIMEOUT} if the timeout elapsed ebfore this happened or another
+{\tt wxCOND\_TIMEOUT} if the timeout elapsed before this happened or another
 error code from wxCondError enum.
 
