X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f510b7b2f386afe6c3705c2cdbc9208435984dac..6d3c4b2aee2a64ba3245f2cec9751e4608a9bc3c:/docs/latex/wx/clipbrd.tex

diff --git a/docs/latex/wx/clipbrd.tex b/docs/latex/wx/clipbrd.tex
index 8ed7fef907..a216479e01 100644
--- a/docs/latex/wx/clipbrd.tex
+++ b/docs/latex/wx/clipbrd.tex
@@ -97,7 +97,7 @@ Call this function to close the clipboard, having opened it with \helpref{wxClip
 Flushes the clipboard: this means that the data which is currently on
 clipboard will stay available even after the application exits (possibly
 eating memory), otherwise the clipboard will be emptied on exit.
-Returns false if the operation is unsuccesful for any reason.
+Returns false if the operation is unsuccessful for any reason.
 
 \membersection{wxClipboard::GetData}\label{wxclipboardgetdata}
 
@@ -116,7 +116,7 @@ Returns true if the clipboard has been opened.
 
 \func{bool}{IsSupported}{\param{const wxDataFormat\&}{ format}}
 
-Returns true if the format of the given data object is available on the clipboard.
+Returns true if there is data which matches the data format of the given data object currently {\bf available} (IsSupported sounds like a misnomer, FIXME: better deprecate this name?) on the clipboard.
 
 \membersection{wxClipboard::Open}\label{wxclipboardopen}
 
