X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f510b7b2f386afe6c3705c2cdbc9208435984dac..68ca6f52521f2f69e88e992f2d0788462e61a2d9:/docs/latex/wx/clipbrd.tex

diff --git a/docs/latex/wx/clipbrd.tex b/docs/latex/wx/clipbrd.tex
index 8ed7fef907..603e28b52e 100644
--- a/docs/latex/wx/clipbrd.tex
+++ b/docs/latex/wx/clipbrd.tex
@@ -97,7 +97,7 @@ Call this function to close the clipboard, having opened it with \helpref{wxClip
 Flushes the clipboard: this means that the data which is currently on
 clipboard will stay available even after the application exits (possibly
 eating memory), otherwise the clipboard will be emptied on exit.
-Returns false if the operation is unsuccesful for any reason.
+Returns false if the operation is unsuccessful for any reason.
 
 \membersection{wxClipboard::GetData}\label{wxclipboardgetdata}
 
